M: -23.056 S: -21.677 M: -21.937 S: -21.893 M: -21.927 R=0.00 R=1.20 R=1.77 R=1.90 R=2.10

*S: -21.209 M: -21.854 S: -21.265 M: -21.835 S: -21.353 R=2.79 R=3.57 R=3.17 R=3.47 R=4.00

M: -22.441 S: -22.035 M: -23.589 R=4.63 R=5.01 R=5.41