Sr

+
Ar

3

22 24 26 28

E [10

3
 cm

-1
]

Sr

+
Ar

5

22 24 26 28

E [10

3
 cm

-1
]

Sr

+
Ar

8

22 24 26 28

E [10

3
 cm

-1
]

Sr

+
Ar

7

22 24 26 28

E [10

3
 cm

-1
]

Sr

+
Ar

6

Sr

+
Ar

4

In te n s ity [a rb . u n its ]

Sr

+
Ar

2